2 2.5 3 3.5 4 4.5 5 )^2c

(GeV/ μμm

1

10

210

310

410

2c Counts per 50 MeV/

= 5.02 TeV s ALICE, pp < 4 y , 2.5 < -μ^+μ→ψ Inclusive J/ | < 1 η Mult. classes: | 7− = 1 trk corr N 47 ± = 1641 raw ψJ/ N 2c 1 MeV/ ± = 3097 ψJ/μ 2c 1 MeV/ ± = 68 ψJ/σ

ALI-PUB-530562

ALI-PUB-530562